From 89560a61bc6e41d86acaea596762eda2da38fe50 Mon Sep 17 00:00:00 2001
From: Arda Serdar Pektezol <1669855+pektezol@users.noreply.github.com>
Date: Mon, 9 Sep 2024 19:29:42 +0300
Subject: refactor: upload run form, lots of random shit

---
 frontend/src/components/Login.tsx | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'frontend/src/components/Login.tsx')

diff --git a/frontend/src/components/Login.tsx b/frontend/src/components/Login.tsx
index adfa718..367dc72 100644
--- a/frontend/src/components/Login.tsx
+++ b/frontend/src/components/Login.tsx
@@ -35,7 +35,7 @@ const Login: React.FC<LoginProps> = ({ token, setToken, profile, setProfile }) =
                 <img src={profile.avatar_link} alt="" />
                 <span>{profile.user_name}</span>
               </button>
-              <button className='sidebar-button' onClick={_logout}>
+              <button className='logout-button' onClick={_logout}>
                 <img src={ExitIcon} alt="" /><span></span>
               </button>
             </Link>
-- 
cgit v1.2.3

