From 89560a61bc6e41d86acaea596762eda2da38fe50 Mon Sep 17 00:00:00 2001
From: Arda Serdar Pektezol <1669855+pektezol@users.noreply.github.com>
Date: Mon, 9 Sep 2024 19:29:42 +0300
Subject: refactor: upload run form, lots of random shit

---
 frontend/src/pages/Homepage.tsx | 1 +
 1 file changed, 1 insertion(+)

(limited to 'frontend/src/pages/Homepage.tsx')

diff --git a/frontend/src/pages/Homepage.tsx b/frontend/src/pages/Homepage.tsx
index 62a8f1c..d4f3095 100644
--- a/frontend/src/pages/Homepage.tsx
+++ b/frontend/src/pages/Homepage.tsx
@@ -6,6 +6,7 @@ const Homepage: React.FC = () => {
     return (
         <main>
             <section>
+                <p/>
                 <h1><img src={PortalIcon} alt="lphub"/>Welcome to Least Portals Hub!</h1>
                 <p>At the moment, LPHUB is in beta state. This means that the site has only the core functionalities enabled for providing both collaborative information and competitive leaderboards.</p>
                 <p>The website should feel intuitive to navigate around. For any type of feedback, reach us at LPHUB Discord server.</p>
-- 
cgit v1.2.3

